\documentclass[11pt,twoside]{article}\makeatletter

\IfFileExists{xcolor.sty}%
  {\RequirePackage{xcolor}}%
  {\RequirePackage{color}}
\usepackage{colortbl}
\usepackage{wrapfig}
\usepackage{ifxetex}
\ifxetex
  \usepackage{fontspec}
  \usepackage{xunicode}
  \catcode`⃥=\active \def⃥{\textbackslash}
  \catcode`❴=\active \def❴{\{}
  \catcode`❵=\active \def❵{\}}
  \def\textJapanese{\fontspec{Noto Sans CJK JP}}
  \def\textChinese{\fontspec{Noto Sans CJK SC}}
  \def\textKorean{\fontspec{Noto Sans CJK KR}}
  \setmonofont{DejaVu Sans Mono}
  
\else
  \IfFileExists{utf8x.def}%
   {\usepackage[utf8x]{inputenc}
      \PrerenderUnicode{–}
    }%
   {\usepackage[utf8]{inputenc}}
  \usepackage[english]{babel}
  \usepackage[T1]{fontenc}
  \usepackage{float}
  \usepackage[]{ucs}
  \uc@dclc{8421}{default}{\textbackslash }
  \uc@dclc{10100}{default}{\{}
  \uc@dclc{10101}{default}{\}}
  \uc@dclc{8491}{default}{\AA{}}
  \uc@dclc{8239}{default}{\,}
  \uc@dclc{20154}{default}{ }
  \uc@dclc{10148}{default}{>}
  \def\textschwa{\rotatebox{-90}{e}}
  \def\textJapanese{}
  \def\textChinese{}
  \IfFileExists{tipa.sty}{\usepackage{tipa}}{}
\fi
\def\exampleFont{\ttfamily\small}
\DeclareTextSymbol{\textpi}{OML}{25}
\usepackage{relsize}
\RequirePackage{array}
\def\@testpach{\@chclass
 \ifnum \@lastchclass=6 \@ne \@chnum \@ne \else
  \ifnum \@lastchclass=7 5 \else
   \ifnum \@lastchclass=8 \tw@ \else
    \ifnum \@lastchclass=9 \thr@@
   \else \z@
   \ifnum \@lastchclass = 10 \else
   \edef\@nextchar{\expandafter\string\@nextchar}%
   \@chnum
   \if \@nextchar c\z@ \else
    \if \@nextchar l\@ne \else
     \if \@nextchar r\tw@ \else
   \z@ \@chclass
   \if\@nextchar |\@ne \else
    \if \@nextchar !6 \else
     \if \@nextchar @7 \else
      \if \@nextchar (8 \else
       \if \@nextchar )9 \else
  10
  \@chnum
  \if \@nextchar m\thr@@\else
   \if \@nextchar p4 \else
    \if \@nextchar b5 \else
   \z@ \@chclass \z@ \@preamerr \z@ \fi \fi \fi \fi
   \fi \fi  \fi  \fi  \fi  \fi  \fi \fi \fi \fi \fi \fi}
\gdef\arraybackslash{\let\\=\@arraycr}
\def\@textsubscript#1{{\m@th\ensuremath{_{\mbox{\fontsize\sf@size\z@#1}}}}}
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\def\abbr{}
\def\corr{}
\def\expan{}
\def\gap{}
\def\orig{}
\def\reg{}
\def\ref{}
\def\sic{}
\def\persName{}\def\name{}
\def\placeName{}
\def\orgName{}
\def\textcal#1{{\fontspec{Lucida Calligraphy}#1}}
\def\textgothic#1{{\fontspec{Lucida Blackletter}#1}}
\def\textlarge#1{{\large #1}}
\def\textoverbar#1{\ensuremath{\overline{#1}}}
\def\textquoted#1{‘#1’}
\def\textsmall#1{{\small #1}}
\def\textsubscript#1{\@textsubscript{\selectfont#1}}
\def\textxi{\ensuremath{\xi}}
\def\titlem{\itshape}
\newenvironment{biblfree}{}{\ifvmode\par\fi }
\newenvironment{bibl}{}{}
\newenvironment{byline}{\vskip6pt\itshape\fontsize{16pt}{18pt}\selectfont}{\par }
\newenvironment{citbibl}{}{\ifvmode\par\fi }
\newenvironment{docAuthor}{\ifvmode\vskip4pt\fontsize{16pt}{18pt}\selectfont\fi\itshape}{\ifvmode\par\fi }
\newenvironment{docDate}{}{\ifvmode\par\fi }
\newenvironment{docImprint}{\vskip 6pt}{\ifvmode\par\fi }
\newenvironment{docTitle}{\vskip6pt\bfseries\fontsize{22pt}{25pt}\selectfont}{\par }
\newenvironment{msHead}{\vskip 6pt}{\par}
\newenvironment{msItem}{\vskip 6pt}{\par}
\newenvironment{rubric}{}{}
\newenvironment{titlePart}{}{\par }

\newcolumntype{L}[1]{){\raggedright\arraybackslash}p{#1}}
\newcolumntype{C}[1]{){\centering\arraybackslash}p{#1}}
\newcolumntype{R}[1]{){\raggedleft\arraybackslash}p{#1}}
\newcolumntype{P}[1]{){\arraybackslash}p{#1}}
\newcolumntype{B}[1]{){\arraybackslash}b{#1}}
\newcolumntype{M}[1]{){\arraybackslash}m{#1}}
\definecolor{label}{gray}{0.75}
\def\unusedattribute#1{\sout{\textcolor{label}{#1}}}
\DeclareRobustCommand*{\xref}{\hyper@normalise\xref@}
\def\xref@#1#2{\hyper@linkurl{#2}{#1}}
\begingroup
\catcode`\_=\active
\gdef_#1{\ensuremath{\sb{\mathrm{#1}}}}
\endgroup
\mathcode`\_=\string"8000
\catcode`\_=12\relax

\usepackage[a4paper,twoside,lmargin=1in,rmargin=1in,tmargin=1in,bmargin=1in,marginparwidth=0.75in]{geometry}
\usepackage{framed}

\definecolor{shadecolor}{gray}{0.95}
\usepackage{longtable}
\usepackage[normalem]{ulem}
\usepackage{fancyvrb}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{marginnote}

\renewcommand{\@cite}[1]{#1}


\renewcommand*{\marginfont}{\itshape\footnotesize}

\def\Gin@extensions{.pdf,.png,.jpg,.mps,.tif}

  \pagestyle{fancy}

\usepackage[pdftitle={Making use of CO 2 Capture for Transform Industrial Production -Supplement of Making use of CO 2 Capture for Saving Earth and Human},
 pdfauthor={}]{hyperref}
\hyperbaseurl{}

	 \paperwidth210mm
	 \paperheight297mm
              
\def\@pnumwidth{1.55em}
\def\@tocrmarg {2.55em}
\def\@dotsep{4.5}
\setcounter{tocdepth}{3}
\clubpenalty=8000
\emergencystretch 3em
\hbadness=4000
\hyphenpenalty=400
\pretolerance=750
\tolerance=2000
\vbadness=4000
\widowpenalty=10000

\renewcommand\section{\@startsection {section}{1}{\z@}%
     {-1.75ex \@plus -0.5ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large\bfseries}}
\renewcommand\subsection{\@startsection{subsection}{2}{\z@}%
     {-1.75ex\@plus -0.5ex \@minus- .2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large}}
\renewcommand\subsubsection{\@startsection{subsubsection}{3}{\z@}%
     {-1.5ex\@plus -0.35ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\large}}
\renewcommand\paragraph{\@startsection{paragraph}{4}{\z@}%
     {-1ex \@plus-0.35ex \@minus -0.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\normalsize}}
\renewcommand\subparagraph{\@startsection{subparagraph}{5}{\parindent}%
     {1.5ex \@plus1ex \@minus .2ex}%
     {-1em}%
     {\reset@font\normalsize\bfseries}}


\def\l@section#1#2{\addpenalty{\@secpenalty} \addvspace{1.0em plus 1pt}
 \@tempdima 1.5em \begingroup
 \parindent \z@ \rightskip \@pnumwidth 
 \parfillskip -\@pnumwidth 
 \bfseries \leavevmode #1\hfil \hbox to\@pnumwidth{\hss #2}\par
 \endgroup}
\def\l@subsection{\@dottedtocline{2}{1.5em}{2.3em}}
\def\l@subsubsection{\@dottedtocline{3}{3.8em}{3.2em}}
\def\l@paragraph{\@dottedtocline{4}{7.0em}{4.1em}}
\def\l@subparagraph{\@dottedtocline{5}{10em}{5em}}
\@ifundefined{c@section}{\newcounter{section}}{}
\@ifundefined{c@chapter}{\newcounter{chapter}}{}
\newif\if@mainmatter 
\@mainmattertrue
\def\chaptername{Chapter}
\def\frontmatter{%
  \pagenumbering{roman}
  \def\thechapter{\@roman\c@chapter}
  \def\theHchapter{\roman{chapter}}
  \def\thesection{\@roman\c@section}
  \def\theHsection{\roman{section}}
  \def\@chapapp{}%
}
\def\mainmatter{%
  \cleardoublepage
  \def\thechapter{\@arabic\c@chapter}
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \pagenumbering{arabic}
  \setcounter{secnumdepth}{6}
  \def\@chapapp{\chaptername}%
  \def\theHchapter{\arabic{chapter}}
  \def\thesection{\@arabic\c@section}
  \def\theHsection{\arabic{section}}
}
\def\backmatter{%
  \cleardoublepage
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \setcounter{secnumdepth}{2}
  \def\@chapapp{\appendixname}%
  \def\thechapter{\@Alph\c@chapter}
  \def\theHchapter{\Alph{chapter}}
  \appendix
}
\newenvironment{bibitemlist}[1]{%
   \list{\@biblabel{\@arabic\c@enumiv}}%
       {\settowidth\labelwidth{\@biblabel{#1}}%
        \leftmargin\labelwidth
        \advance\leftmargin\labelsep
        \@openbib@code
        \usecounter{enumiv}%
        \let\p@enumiv\@empty
        \renewcommand\theenumiv{\@arabic\c@enumiv}%
	}%
  \sloppy
  \clubpenalty4000
  \@clubpenalty \clubpenalty
  \widowpenalty4000%
  \sfcode`\.\@m}%
  {\def\@noitemerr
    {\@latex@warning{Empty `bibitemlist' environment}}%
    \endlist}

\def\tableofcontents{\section*{\contentsname}\@starttoc{toc}}
\parskip0pt
\parindent1em
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\newenvironment{reflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemsep}{0pt}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\itshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{sansreflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\itemsep}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\upshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{specHead}[2]%
 {\vspace{20pt}\hrule\vspace{10pt}%
  \phantomsection\label{#1}\markright{#2}%

  \pdfbookmark[2]{#2}{#1}%
  \hspace{-0.75in}{\bfseries\fontsize{16pt}{18pt}\selectfont#2}%
  }{}
      \def\TheFullDate{2021-07-15 (revised: 15 July 2021)}
\def\TheID{\makeatother }
\def\TheDate{2021-07-15}
\title{Making use of CO 2 Capture for Transform Industrial Production -Supplement of Making use of CO 2 Capture for Saving Earth and Human}
\author{}\makeatletter 
\makeatletter
\newcommand*{\cleartoleftpage}{%
  \clearpage
    \if@twoside
    \ifodd\c@page
      \hbox{}\newpage
      \if@twocolumn
        \hbox{}\newpage
      \fi
    \fi
  \fi
}
\makeatother
\makeatletter
\thispagestyle{empty}
\markright{\@title}\markboth{\@title}{\@author}
\renewcommand\small{\@setfontsize\small{9pt}{11pt}\abovedisplayskip 8.5\p@ plus3\p@ minus4\p@
\belowdisplayskip \abovedisplayskip
\abovedisplayshortskip \z@ plus2\p@
\belowdisplayshortskip 4\p@ plus2\p@ minus2\p@
\def\@listi{\leftmargin\leftmargini
               \topsep 2\p@ plus1\p@ minus1\p@
               \parsep 2\p@ plus\p@ minus\p@
               \itemsep 1pt}
}
\makeatother
\fvset{frame=single,numberblanklines=false,xleftmargin=5mm,xrightmargin=5mm}
\fancyhf{} 
\setlength{\headheight}{14pt}
\fancyhead[LE]{\bfseries\leftmark} 
\fancyhead[RO]{\bfseries\rightmark} 
\fancyfoot[RO]{}
\fancyfoot[CO]{\thepage}
\fancyfoot[LO]{\TheID}
\fancyfoot[LE]{}
\fancyfoot[CE]{\thepage}
\fancyfoot[RE]{\TheID}
\hypersetup{citebordercolor=0.75 0.75 0.75,linkbordercolor=0.75 0.75 0.75,urlbordercolor=0.75 0.75 0.75,bookmarksnumbered=true}
\fancypagestyle{plain}{\fancyhead{}\renewcommand{\headrulewidth}{0pt}}

\date{}
\usepackage{authblk}

\providecommand{\keywords}[1]
{
\footnotesize
  \textbf{\textit{Index terms---}} #1
}

\usepackage{graphicx,xcolor}
\definecolor{GJBlue}{HTML}{273B81}
\definecolor{GJLightBlue}{HTML}{0A9DD9}
\definecolor{GJMediumGrey}{HTML}{6D6E70}
\definecolor{GJLightGrey}{HTML}{929497} 

\renewenvironment{abstract}{%
   \setlength{\parindent}{0pt}\raggedright
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
   \textcolor{GJBlue}{\large\bfseries\abstractname\space}
}{%   
   \vskip8pt
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
}

\usepackage[absolute,overlay]{textpos}

\makeatother 
      \usepackage{lineno}
      \linenumbers
      
\begin{document}

             \author[1]{Jia-Min  Jin}

\renewcommand\Authands{ and }

\date{\small \em Received: 12 June 2021 Accepted: 3 July 2021 Published: 15 July 2021}

\maketitle


\begin{abstract}
        


This paper focuses on the supplementary explanation and modification of the six published article for 9 aspects. Including the energy storage reaction and storage index, push rod type electric furnace, the production of sponge iron and lime is accompanied by the production of nitrogen-free gas, to promote the use of gas in countryside, lime is cycliceally used to capture carbon dioxide in the flue, to make full use of natural resources and some problems to be studied in industrial production.

\end{abstract}


\keywords{carbon dioxide storage reaction and storage index CCS CCSE SSE.}

\begin{textblock*}{18cm}(1cm,1cm) % {block width} (coords) 
\textcolor{GJBlue}{\LARGE Global Journals \LaTeX\ JournalKaleidoscope\texttrademark}
\end{textblock*}

\begin{textblock*}{18cm}(1.4cm,1.5cm) % {block width} (coords) 
\textcolor{GJBlue}{\footnotesize \\ Artificial Intelligence formulated this projection for compatibility purposes from the original article published at Global Journals. However, this technology is currently in beta. \emph{Therefore, kindly ignore odd layouts, missed formulae, text, tables, or figures.}}
\end{textblock*}


\let\tabcellsep& 	 	 		 
\section[{Introduction}]{Introduction}\par
II. There are Many Problems with the CCS Technical Route he warming of the earth and the frequent occurrence of extreme weather have seriously affected the survival and life of human beings. There was a great deal of anxiety. The United Nations has held many meetings, especially in Paris. Scientists generally believe that the earth is warming as a result of massive emissions of carbon dioxide from industrial production. As a result, the capture and storage of CO 2 on a global scale, known as the Carbon Capture and Storage-CCS technical route, has become the focus of research by many scientists and the strategy of governments. Zhang Dongxiao, director of the Clean Energy Research Institute at Peking University, said that the CCS technical route could become the single largest carbon reduction technology in the world. The UN's International Energy Agency (IEA) has repeatedly stressed that the CCS technical route remains an important solution for reducing greenhouse gas emissions. It calls for 200 CCS projects globally to be operational by 2020 and 3,000 by 2050. Between 2015 and 2050, the world should capture and store 120 billion tonnes of carbon dioxide. The CCS technical route from an American power plant seems to be the only one that can save the earth.\par
Since 2016, the author has published 6 articles on the use of captured carbon dioxide storage to save the earth in domestic and foreign journals. The contents involve climate change, energy, environmental protection and other major issues, This paper aims to further clarify the author's point of view, it is hoping to arouse people's attention. 
\section[{T}]{T}\par
In previous articles  {\ref [1?2?3?4?5?6]}, the author has repeatedly pointed out that there are a number of problems with the current CCS route being rolled out globally. Such as high cost, limited burial places, there is a carbon dioxide leakage of safety risks.\par
Experts believe that the only way out for CCS technology is through a combination of storage and application. If we have buryed all the captured carbon dioxide, it would be economically unbearable. However, the purification application of carbon dioxide is a worldwide problem, which has not been solved yet. The authors argue that even if this puzzle is solved, its application may be limited, so the CCS technical route is a dead end. Although the internationally recognized CCS technical route is still in the research stage, 56 CCS projects are already operating or planned around the world. China also has 11 CCS projects planned or in operation. It can be seen that people are anxious about the warming of the climate.\par
The author first proposed CCSE in 2016 and SSE in 2020. CCSE or SSE technology is a technology that can convert electrical energy into chemical energy and then store and apply it.\par
It`s theory is that carbon gasification is an endothermic or energy-storage reaction (C+CO 2 =2CO Î?"H 0 298 0 k =+162297kj/mol). this is a simple chemical reaction. It has been used in industrial production for more than 100 years. Such as gas generator, blast furnace making iron.etc.\par
The combination of storage and application is the only feasible route for CCSE or SSE. The climate can be controlled by adjusting the proportion of storage and application. SSE different from CCSE is that the smoke is applied directly. SSE saves an expensive capture cost. The deficiency of SSE is that there is a large amount of nitrogen in the gas, the calorific value is lower, if it is used cyclically, the calorific value is getting lower and lower, and the production process is unstable. Therefore, it is necessary to improve and stabilize carbon dioxide content in smoke by simple centrifugation-gravity method. If the cost of using compression separation to capture carbon dioxide can reach \$25/t, as announced by the Massachusetts Institute of Technology, and the cost of producing carbon monoxide per meter is only \$0.025, it is entirely acceptable.\par
The mechanism of carbon catalysis gasification has been studied for more than 50 years. CCSE or SSE technique is the extension of carbon gasification catalysis mechanism research. 
\section[{IV. The Energy Storage Reaction and the Energy Storage Index -Zn}]{IV. The Energy Storage Reaction and the Energy Storage Index -Zn}\par
There are two common endothermic reactions; namely C+CO 2 =2CO -162297kj/kg.mol. \hyperref[fig_1]{---------------(1})C+H 2 O=H 2 +CO -131381kj/ kg.mol---------------(2)\par
Both of these reactions are endothermic or energy-storing reactions. These two reactions exist in the gas generator furnace.\par
Equation (  {\ref 1}) is the carbon gasification reaction, also known as Bouduard reaction. It is very importent reaction. Many industrial products depend entirely on this reaction. such as Fe, Cu etc.. The heat released by the combustion of carbon monoxide from the gasification reaction is the heat stored.2CO+O 2 =2CO 2 +570865kj/kg--------------(3)\par
The energy storage index ZN is the ratio of the energy stored by gas after the chemical reaction to the energy consumed during the chemical reaction, which is used to measure the energy storage efficiency of different carbonaceous materials? For carbon gasification reaction, the storage value is compared with the consumption value, namely (3)/(1)?570865/162297=3.517, deduct about 3\% of the furnace wall heat loss, The energy storage index ZN of carbon gasification reaction Is ZN=3.4. This data shows that the energy stored after gasification is 3.4 times that consumed. It is known that the direct combustion to indirect combustion, especially compared with the rural hearth, can significantly improve the thermal efficiency, thermal efficiency can completely offset the heat loss of the furnace wall, so the electric heating gas generator can be called zero energy electric heating gas generator. In terms of economy, it is very economical to use electric heating furnace to produce gas.\par
The raw materials for the production of gas always contain water, and C+H 2 O=CO+H 2 is also an endothermic or energy-storage reaction.H 2 O+1/2O 2 =H 2 O -285800kj/mol kg-----------\textbf{(4)}\par
[( \hyperref[formula_2]{4})+2/1(3)]/(2), namely ZN= [285800+285432]/ 131381=4.35.\par
When zn> 4.0 and the thermal efficiency of the thermal power plant increases to 50\%(the highest thermal efficiency of the thermal power plant is 46\% at present), the energy stored in the gas produced by valley electricity can fully meet the energy required for peak electricity generation, which alone can save half of the thermal power coal consumption. The reduction in carbon dioxide emissions by nearly half is staggering, I should say. On this basis alone, the amount of gas that needs to be stored may be small.\par
The United States and China account for 52\% of global carbon dioxide emissions, China accounted for 35\%. If China and the United States can work together, so it can save half of the coal consumption of the thermal plant, the problem of global warming will maybe solve.\par
Energy storage index ZN=3.52 is a very reliable and important data. The ZN tells you very clearly, although electricity is in short supply around the world, there are two things that people should understand. First, it is not willing to use electricity to produce gas, which may be that many scientists so far has not proposed the electric gas generation furnace thought concerns. This concern now seems unnecessary. Second, because of the Zn > 4, people would naturally think that the first use of electricity in lighting, electrical machinery and so on seems unreasonable. Electricity shall first be supplied to a zero-energy electric heating gas generator. It can both consume large amounts of carbon dioxide, plastic waste, eliminate white pollution and the ability to control the climate warming that people are so worried about.\par
V. 
\section[{Develop Electric Gas Generator Energetically}]{Develop Electric Gas Generator Energetically}\par
Volume XXI Issue II Version I The author thinks that the development of electric gas generator is based on: ? CO 2 buried as waste in CCS technical route becomes the main raw material for gas production in CCSE or SSE technical route. The purpose of climate control can be achieved by adjusting the proportion between storage and application of gas. ? CCSE or SSE technical routes can consume a lot of firewood, waste plastic, eliminate the white pollution that people are so worried about, and protect the environment. ? The ZN=3.52 for the carbon gasification reaction in the electric heating gas generator is very economical. The electric gas generator is the only major device in CCSE or SSE, but it is an innovative device that has not been seen so far. It is actually an electric heating furnace. In addition to the generator, the Because the composition of raw materials such as firewood cannot be stable?Therefore, a pulverized coal injection device should be installed at the end of the furnace. According to the analysis results of the gas composition, the CO 2 content in the gas should be guaranteed under 2\% to ensure the stable calorific value of the gas. 
\section[{VI. Sponge Iron and Nitrogen-Free}]{VI. Sponge Iron and Nitrogen-Free}\par
High Calorific Clean Gas are Produced Simultaneously by using Electric Heating Gas Generator At present, the world's production of sponge iron is between 50 and 60 million tons. Most of them are used to make steel in electric furnaces. Part of it is used in powder metallurgy production. There are more than 20 methods to produce sponge iron. However, converter and the tunnel kiln is still the main method .Both completely rely on carbon gasification reaction to produce sponge iron (C+CO 2 =2CO, CO+FeO= Fe+CO 2 ).\par
ancillary equipment is the compressor and a number of storage gas bags or tank.\par
The power of furnace depends on the output. It takes about 1kwh (1.06 kwh) to produce 1m 3 of gas, and 1000kW of power to produce 1,000m 3 of gas an hour.\par
The type of furnace may be varied. Such as vertical, horizontal, converter etc..\par
The converter type which is widely used in cement and sponge iron production, its advantage is that the furnace charge in the furnace is constantly turn back, so it reacts fast. For easily broken processing of raw materials, such as coal, firewood, plastic and so on, it is more appropriate:\par
The ancient tunnel kiln type electric gas generator has the advantages of mature technology, simple structure, small investment and small operation energy consumption, among which the biggest advantage is that raw materials such as firewood, garbage and corpse do not need to be processed and can be directly put on the kiln car. Its disadvantage is that the reactants such as coal are fixed on the kiln boat and the reaction speed is slower.\par
Push-rod electric gas generator (FIG. \hyperref[fig_1]{1}) should be the simplest type of furnace and minimum investment. Furnace body can be large or small. It can be generalized in the countryside? Figure  {\ref 2}: Gas velocity and composition released from the reduction reaction tank Figure  {\ref 2} is flow velocity and composition of gas released from the reduction reaction tank. The CO content in the gas is about 65\%, and the CO 2 content is about 35\%(Different reduction stages have different gas composition). When we add small solid carbon outside the reaction tank and completely convert 35\% CO 2 to CO, we can get 100\%CO gas with nitrogen-free almost. Because at the beginning, the reaction tank is filled with iron oxide and carbon powder. There is small air left and it's expelled very quickly at the beginning of the reaction. So we get nitrogen-free high calorific value clean gas. The result is similar to using high purity oxygen to gas.\par
According to the chemical reaction formula (Fe 2 O 3 +3C=2Fe+3CO), For every 1 ton of sponge iron produced, 600m 3 of high purity clean gas can be obtained. Now, however, the current production is not like this at all.\par
The CO released from the reduction reaction tank is burned into CO 2 in the furnace,then It is expeled from the furnace with smoke. At 50 million tons of sponge iron a year, We throw away 30 billion m 3 of nitrogen-free quality gas every year.\par
Global iron ore production was 2.163 billion tonnes in 2017. Calculated at an average grade of 48.8\%, the concentrates should have 10. 6 billion tons. It contains 306 million tons of oxygen. According to the current production technology, After smelting, these oxygen are expelled as CO 2 form, which is nearly 420 million tons. Oxygen in iron ore is not being used. To the contrary, It pollutes the air. The author thinks that man has wasted the valuable natural resources again.\par
There are many advantages to producing sponge iron and gas simultaneously. Such as: The iron and oxygen in iron ore are used, reduced CO 2 emissions. obtainded quality nitrogen-free gas, reduced coke consumption, the cost of production has fallen considerably. This approach has a strong competitiveness. 
\section[{VII.}]{VII.}\par
Lime and Nitrogen-Free High Calorific Value Clean Gas are Produced Simultaneously by Make use of Electric Heating Gas Generator CaO (commonly known as lime) is the main ingredient in cement, and its content ranges from 64 to 67\%. Calcined limestone releases 44\% of CO 2 , that is, a ton of calcined limestone releases 440 kilograms of CO 2 . In 2016, the global output of cement is 5 billion tons, China is 2.5 billion tons, based on 65\% content, CaO is 3.25 billion tons, the limestone consumption is 5.8 billion tons, and the carbon dioxide emitted is 2.55 billion tons. According to the calculation that one ton of CO 2 can produce 1,000 m 3 of carbon monoxide, 2.55 billion tons of CO 2 can produce 2.55 trillion m 3 of nitrogen-free clean gas with high calorific value. At present, 2.55 billion tons of carbon dioxide are all released into the sky, and valuable natural resources are once again being wasted by humans. According to the following reaction:CaCO 3 =CaO+CO 2 Î?"H 0 298 =+177.4kj/mol----------(4) C+CO 2 =2CO Î?"H 0 298 =+162.297kj/mol -----\textbf{(5)}\par
CaCO 3 +C=CaO+2CO Î?"H 0 298 =+339.697kj/mol----(  {\ref 6})2CO+O 2 =2CO 2 Î?"H 0 298 =-570.865kj/mol----\textbf{(7)}\par
The energy storage index ZN is calculated; ZN=(7)/(6)=570.865/339.697=1.68. This 1.68 means that one energy is consumed and 1.68 energy is stored, so It is very economical to produce nitrogen-free high calorific clean gas when producing lime.\par
Volume XXI Issue II Version I   
\section[{VIII. Gas is used in the Vast Countryside}]{VIII. Gas is used in the Vast Countryside}\par
The countryside is a vast world. as far as the eye can reach.\par
Every plant and animal on the ground, growing day and night, have stored a great deal of energy, which people should make full use of.\par
As shown in Figure \hyperref[fig_1]{1}, push-rod type gas generator is most suitable for general promotion in rural areas. A small 20KW electric stove can produce 480m 3 of gas per day, which can supply thousands of farmers. It's also very economical.\par
Rural coal gasification, not only the use of resources, and the protection of resources, and the protection of the environment. Beautiful scenery, heaven on earth. 
\section[{IX.}]{IX.} 
\section[{Power Supply}]{Power Supply}\par
The International Energy Agency (IEA) has called for the capture and bury of 120 billion tonnes of CO 2 in global between 2015 and 2050. That's an average of 3.4 billion tons a year, it is about a tenth of annual emissions 33 billion tons(2018). Adopting the CCSE technology route to convert 3.4 billion tons of CO 2 into CO requires 3.4 trillion kwh, which can produce 3.4 trillion m 3 of CO. It must be considers that the CCSE technical route must be a combination of storage and application, at the same time, considering the price of electricity (0.72 yuan/kwh rmb) and the price of gas (2.5 yuan/m3), 2.5/0.72=3.47, that is, the cost of applying 1m 3 gas can offset the cost of storing 3.47 m 3 of gas. Because each country coal electricity price is different, afore-mentioned only for reference. To set the application to storage ratio at 1/ 3, which should be feasible. Thus, the amount of CO 2 required for gasification is 4.8 billion tons. The amount of electricity used is 4800 billion kwh. The production of CO is 4.8 billion m 3 , of which 3.4 billion m 3 are for storage and 1.4 trillion m 3 for application.\par
Today, the world's electricity generation is 2.5551.28 billion kwh, China is 6495.14 billion kwh, accounting for 1/4, the United States 4281.74 billion kwh, accounting for 16.8 \%. According to this, China's electricity generation alone can fully meet the requirements of 4.8 trillion degrees. But the author still thinks that first time electricity should be electric gas generator. Lighting, electric machinery and so on should be secondary electricity. This not only uses a large number of resources on the ground, protects the environment, Controlling the climate, but also protects underground resources. 
\section[{X.}]{X.} 
\section[{Several Issues to be Discussed}]{Several Issues to be Discussed}\par
According to the energy storage index ZN=3.4 of carbon gasification reaction, we consider inevitably that there are many problems worth studying in the current industrial production. 
\section[{a) Pumped storage power station}]{a) Pumped storage power station}\par
The purpose of energy storage is achieved to use valley electricity to lift the water from the lower reservoir to the upper reservoir and convert mechanical energy into potential energy.\par
There are many such pumped storage plants around the world. China's current installed capacity is 27.73 million kw, surpassing Japan and becoming the world's largest. It accounts for less than 0.01\% of the country's total installed capacity.\par
The thermal efficiency of pumped storage power station is 70\% and ZN is negative value, which is compared with the electric gas generator of ZN > 4. Obviously, it is more reasonable to build electric gas generator. 
\section[{b) Garbage Incinerator and Cinerator}]{b) Garbage Incinerator and Cinerator}\par
Currently, garbage incinerators and cinerator are widely used worldwide. Firewood, plastic, rubber, seaweed, animal carcasses and so on, which store a large of energy, are burned by a torch, which not only also pollutes the environment, which is a very unreasonable measure.\par
Example; Plastic pollution is already a very serious problem? Four billion tons of plastic are already buried in the ground or stacked in nature. Ten million tons of tiny plastic particles enter the ocean every year There are now 150 million tons of plastic in the ocean? According to the molecule structural formula, t he calculation results show that 1 t of PE or PP type plastic reaction with CO2 at high temperature, can produce 4800 m3CO and H2 clean gas. So a lot of energy has been wasted by humans.\par
A 50-kilogram animal carcass can produce about 120 m 3 of high-heat clean gas. Worldwide, about 150,000 people die each day. If used to produce gas, 18 million m 3 of high-calorific value clean gas could be produced each day. 
\section[{c) Full use of Natural Resources}]{c) Full use of Natural Resources}\par
As mentioned earlier, gas can be produced at the same time as sponge iron, 1 t of sponge iron and 600m 3 of nitrogen-free high calorific clean gas. Gas can also be produced when lime is produced at the same time. One ton of limestone can simultaneously produce 560 kg of CaO and 440kg or 440m 3 of nitrogen-free or low-nitrogen high calorific clean gas. At present, however, only Fe and CaO are extracted, and oxygen in iron ore and carbon dioxide in limestone are discarded at total and it pollutes the air at same time.\par
Global cement production is 5 billion tons (China 2.5 billion tons). Based on 65\% CaO content in cement, 5.8 billion tons of limestone was consumed. During calcination, 2.55 billion tons of CO 2 are released. Global iron ore production was 2,230.4 billion tonnes. According to the average iron content of 48.8\%, the concentrate fines(Fe 2 O 3 )is 1.55 billion tons?The oxygen content in iron ore is 470 million tons. The amount of CO 2 released after smelting is 640 million tons. Thus, the amount of CO 2 abandoned from cement and steel production alone is 3.2 billion tons. It accounts for one-tenth of the 33 billion tonnes of CO 2 emitted annually. Endless development of natural resources, and a large amount of waste of resources, this is the tragedy of human beings. 
\section[{d) Making use of Lime to Capture CO 2}]{d) Making use of Lime to Capture CO 2}\par
As you can see from the literature, the methods of capturing CO 2 include chemical assimilate, physical adsorption, physical chemical adsorption, membrane separation and cryogenic separation. And physical assimilate and chemical adsorption It is relatively mature and has small-scale industrial installations. In the CCS technical route, capture cost accounts for 2/3 of the total capture and storage cost. It means the capture cost is very high.\par
As shown in Figure 3, the author thinks that there are several advantages of using lime to capture carbon dioxide. a. CaO+CO 2 ?CaCO 3 reaction is an exothermic reaction, which does not require additional heat. b. The CaO can be recycled. c. The requirement of purity of CO 2 in smoke before and after capture is not strict d. Compared with other capture methods, using lime to capture carbon dioxide, investment and operating costs may be the lowest. e. Cement production costs can be significantly reduced. f. etc.. The flue gas passes through an iron drum. The size, rotation speed and reaction temperature of the drum are determined by the experiment. 
\section[{e) Natural Balance and Balancing Point}]{e) Natural Balance and Balancing Point}\par
The growth of plants and animals on the earth is interdependent? The ppm of carbon dioxide in the air should have a "balance point". If carbon dioxide emissions are greater than plant growth requirements, As a result, the climate is warming.\par
If the emissions are less than the equilibrium value, it is not conducive to plant growth, plants will also die because of lack of carbon dioxide. At present, global electricity generation can convert 75\% of carbon dioxide emissions into carbon monoxide for use and storage. But this is clearly unnecessary and undesirable.\par
The realization of natural balance requires a "balance point". Once a "balance point" is found, the amount of CO 2 to be captured can be determined? XI. 
\section[{Conclusion}]{Conclusion}\par
1. Thermal power plants should use lime or gravitycentrifugal method to capture carbon dioxide in the flue, which can significantly reduce capture costs. 2. Electric gas generator should be used in garbage incinerator. Using electricity and carbon dioxide to produce high-calorie gas. Increase renewable energy, protect resources, protect the environment and eliminate white pollution. 3. When producing lime, gas should be produced at the same time, which can make full use of natural resources, reduce pollution and reduce the cost of lime production. 4. When sponge iron is produced, gas should be produced at the same time, which can make full use of natural resources and realize carbon-free iron making. 5. Electricity transmission is changed to gas transmission, which can save energy consumption, reduce electricity price and benefit the country and the people.\par
Volume XXI Issue II Version I 18 ( )\begin{figure}[htbp]
\noindent\textbf{}\includegraphics[]{image-2.png}
\caption{\label{fig_0}B}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{1}\includegraphics[]{image-3.png}
\caption{\label{fig_1}Figure 1 :}\end{figure}
 \begin{figure}[htbp]
\noindent\textbf{}\includegraphics[]{image-4.png}
\caption{\label{fig_2}B}\end{figure}
  		 		\backmatter  			  				\begin{bibitemlist}{1}
\bibitem[ GJHSS]{b5}\label{b5} 	 		\textit{},  	 	 		\textit{GJHSS}  		20  (10)  p. .  	 
\bibitem[Jia-Min Jin ()]{b1}\label{b1} 	 		‘Make use of capture CO 2 for storage energy and carbon reduction emission’.  		 			Jia-Min Jin 		.  	 	 		\textit{GUANGZHOU CHEMICAL INDUSTRY}  		2017. 45  (6) .  	 
\bibitem[Jia-Min Jin ()]{b3}\label{b3} 	 		‘Making use CO 2 , coal and firewood to produce gas’.  		 			Jia-Min Jin 		.  	 	 		\textit{Journal of low carbon ecomomy}  		2019. 8  (1) .  	 
\bibitem[Jia-Min Jin ()]{b2}\label{b2} 	 		‘Making use of capture CO 2 for storage energy and carbon reduction emission’.  		 			Jia-Min Jin 		.  	 	 		\textit{Journal of low carbon economy}  		2017. 6  (3) .  	 
\bibitem[
			JinJm
		]{b4}\label{b4} 	 		\textit{Making use of CO 2 capture for saving earth and human-A comparison of "Carbon Capture and Storage-CCS" and "Carbon Capture and Stored Energy-CCSE},  		 			JinJm 		.  		 	 
\bibitem[Jia-Min Jin ()]{b0}\label{b0} 	 		‘Power generation technology using CO 2 capturs energy storage’.  		 			Jia-Min Jin 		.  	 	 		\textit{Power \& energy},  				2016. 37.  	 
\bibitem[Jia-Min Jin ()]{b6}\label{b6} 	 		‘Technology of tunnel kiln type electric gas generator development by using captured CO 2 and garbage plastics’.  		 			Jia-Min Jin 		.  	 	 		\textit{Power \& Energy}  		2020. 41  (6) .  	 
\end{bibitemlist}
 			 		 	 
\end{document}
